
DROP TABLE IF EXISTS `sh_order_index`;
CREATE TABLE `sh_order_index`  (
idauto bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
id bigint DEFAULT NULL COMMENT '电站ID',
order_no					varchar(100)  DEFAULT NULL COMMENT '电站编码',
admin_id					varchar(100)  DEFAULT NULL COMMENT '创建人id',
customer_id			varchar(100)  DEFAULT NULL COMMENT '客户id',
agent_id					varchar(100)  DEFAULT NULL COMMENT '代理商id',
product_id				varchar(100)  DEFAULT NULL COMMENT '产品id',
create_time			bigint  DEFAULT NULL COMMENT '创建时间',
data_id					varchar(100)  DEFAULT NULL COMMENT '数据分组',
workflow_unique	varchar(100)  DEFAULT NULL COMMENT '当前流程',
prototype_id			varchar(100)  DEFAULT NULL COMMENT '产品id',
remain_unique		varchar(100)  DEFAULT NULL COMMENT '',
is_best					varchar(100)  DEFAULT NULL COMMENT '是否为标杆电站',
order_type				varchar(100)  DEFAULT NULL COMMENT '电站类型',
update_time			bigint  DEFAULT NULL COMMENT '修改时间',
company_id				varchar(100)  DEFAULT NULL COMMENT '公司id',
dg_name					varchar(100)  DEFAULT NULL COMMENT '数据分组说明',
contract_life		varchar(100)  DEFAULT NULL COMMENT '合同年限',
contract_group		varchar(100)  DEFAULT NULL COMMENT '合同组',
agent_name				varchar(100)  DEFAULT NULL COMMENT '代理商名称',
area_id					varchar(100)  DEFAULT NULL COMMENT '地区id',
address					varchar(100)  DEFAULT NULL COMMENT '详细地址',
component_number	varchar(100)  DEFAULT NULL COMMENT '光伏板块数',
component_power	varchar(100)  DEFAULT NULL COMMENT '组件安装功率',
admin_name				varchar(100)  DEFAULT NULL COMMENT '业务员姓名',
admin_phone			varchar(100)  DEFAULT NULL COMMENT '业务员手机号',
user_name				varchar(100)  DEFAULT NULL COMMENT '用户名',
user_phone				varchar(100)  DEFAULT NULL COMMENT '用户手机号',
id_card					varchar(100)  DEFAULT NULL COMMENT '用户身份证号',
product_name			varchar(100)  DEFAULT NULL COMMENT '产品名称',
workflow_name		varchar(100)  DEFAULT NULL COMMENT '流程名称',
node_id					varchar(100)  DEFAULT NULL COMMENT 'nodeID',
is_agree					varchar(100)  DEFAULT NULL COMMENT '审核是否通过',
group_id					varchar(100)  DEFAULT NULL COMMENT '产品ID',
sign							varchar(100)  DEFAULT NULL COMMENT '是否签署合同，1已签署，2未签署',
uplode_contract	varchar(1024)  DEFAULT NULL COMMENT '手动上传-合同',
company_name			varchar(100)  DEFAULT NULL COMMENT '所属公司名称',
province_name		varchar(100)  DEFAULT NULL COMMENT '省',
city_name				varchar(100)  DEFAULT NULL COMMENT '市',
area_name				varchar(100)  DEFAULT NULL COMMENT '区/县',
assets_no				varchar(100)  DEFAULT NULL COMMENT '资产编号',
change_order_id	varchar(100)  DEFAULT NULL COMMENT '电站变更id',
p_agent_name    varchar(100)  DEFAULT NULL COMMENT '代理商名称',
operation_id    varchar(100)  DEFAULT NULL COMMENT '运维id',
operation_name  varchar(100)  DEFAULT NULL COMMENT '运维名称',
all_power				bigint  DEFAULT NULL COMMENT '总功率',
order_type_text	varchar(100)  DEFAULT NULL COMMENT '产品说明',
is_save					varchar(100)  DEFAULT NULL COMMENT '是否可编辑',
is_m            varchar(100)  DEFAULT NULL COMMENT '0',
  PRIMARY KEY (`idauto`) USING BTREE
) ENGINE=InnoDB COMMENT='电站数据';


DROP TABLE IF EXISTS `sh_screen_order`;
CREATE TABLE `sh_screen_order`  (
id bigint NOT NULL AUTO_INCREMENT COMMENT '电站id',
   order_no  varchar(100)  DEFAULT NULL COMMENT '2021060667629040986641', 
   admin_id  varchar(100)  DEFAULT NULL COMMENT '58,', 
   customer_id  varchar(100)  DEFAULT NULL COMMENT '41,', 
   agent_id  varchar(100)  DEFAULT NULL COMMENT '11,', 
   product_id  varchar(100)  DEFAULT NULL COMMENT '8,', 
   create_time  varchar(100)  DEFAULT NULL COMMENT '1622946409,', 
   data_id  varchar(100)  DEFAULT NULL COMMENT '1,35', 
   workflow_unique  varchar(100)  DEFAULT NULL COMMENT '1_8_0_190_1', 
   prototype_id  varchar(100)  DEFAULT NULL COMMENT '1,', 
   remain_unique  varchar(100)  DEFAULT NULL COMMENT '1,', 
   is_best  varchar(100)  DEFAULT NULL COMMENT '0,', 
   order_type  varchar(100)  DEFAULT NULL COMMENT '1,', 
   update_time  varchar(100)  DEFAULT NULL COMMENT '2024-03-05 10:59:46', 
   company_id  varchar(100)  DEFAULT NULL COMMENT '1,', 
   brand  varchar(100)  DEFAULT NULL COMMENT '山海智慧-古瑞瓦特', 
   inverter_sn_code  varchar(100)  DEFAULT NULL COMMENT 'HSJ0BF20EP', 
   generator_number  varchar(100)  DEFAULT NULL COMMENT '1300771010488', 
   username  varchar(100)  DEFAULT NULL COMMENT '徐金辉', 
   phone  varchar(100)  DEFAULT NULL COMMENT '131****6866', 
   component_number  varchar(100)  DEFAULT NULL COMMENT '89,', 
   component_power  varchar(100)  DEFAULT NULL COMMENT '450,', 
   address  varchar(100)  DEFAULT NULL COMMENT '河北省石家庄市行唐县玉亭乡八里庄村民心路5号', 
   area_id  varchar(100)  DEFAULT NULL COMMENT '15214,', 
   name  varchar(100)  DEFAULT NULL COMMENT '@（行唐）河北晨航能源科技有限公司', 
   full_name  varchar(100)  DEFAULT NULL COMMENT '李**', 
   all_power  varchar(100)  DEFAULT NULL COMMENT '40.05', 
   city_name  varchar(100)  DEFAULT NULL COMMENT '河北省石家庄市行唐县', 
   create_time_text  varchar(100)  DEFAULT NULL COMMENT '2021-06-06 10:26:49', 
   order_type_text  varchar(100)  DEFAULT NULL COMMENT '户用', 
   status  varchar(100)  DEFAULT NULL COMMENT '0,', 
   status_text  varchar(100)  DEFAULT NULL COMMENT '等待', 
   first_time_text  varchar(100)  DEFAULT NULL COMMENT '2021-08-01 00:00:00', 
   total_day_power  varchar(100)  DEFAULT NULL COMMENT '0,', 
   total_month_power  varchar(100)  DEFAULT NULL COMMENT '0,', 
   total_year_power  varchar(100)  DEFAULT NULL COMMENT '6150.1,', 
   total_power  varchar(100)  DEFAULT NULL COMMENT '125715.3,', 
   pac  varchar(100)  DEFAULT NULL COMMENT '0,', 
   hour  varchar(100)  DEFAULT NULL COMMENT '0.0000', 
   day_money  varchar(100)  DEFAULT NULL COMMENT '0.00', 
   month_money  varchar(100)  DEFAULT NULL COMMENT '0.00', 
   total_money  varchar(100)  DEFAULT NULL COMMENT '49582.11', 
   avgPowerDay  varchar(100)  DEFAULT NULL COMMENT '8.66', 
   avgPowerMonth  varchar(100)  DEFAULT NULL COMMENT '3561.15', 
   avgPowerYear  varchar(100)  DEFAULT NULL COMMENT '11417.79', 
   avgPowerTotal  varchar(100)  DEFAULT NULL COMMENT '134367.07', 
   avgHour  varchar(100)  DEFAULT NULL COMMENT '0.17', 
   avgCo2  varchar(100)  DEFAULT NULL COMMENT '66.98', 
   avgTree  varchar(100)  DEFAULT NULL COMMENT '8372.70', 
   avgAllPower  varchar(100)  DEFAULT NULL COMMENT '31.05', 
   avgComponentNumber  varchar(100)  DEFAULT NULL COMMENT '60',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB COMMENT="数据大屏发电列表";



DROP TABLE IF EXISTS `sh_report_xmlctgb`;
CREATE TABLE `sh_report_xmlctgb`  (
id bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  sjjzrq  varchar(100)  DEFAULT NULL COMMENT '数据截止日期', 
  zbsj  varchar(100)  DEFAULT NULL COMMENT '制表时间', 
  zbh  varchar(100)  DEFAULT '10' COMMENT '组编号', 
  zmc  varchar(100)  DEFAULT NULL COMMENT '组名称', 
  hbh  varchar(100)  DEFAULT '1001' COMMENT '行编号', 
  hmc  varchar(100)  DEFAULT NULL COMMENT '行名称', 
	 
qbqy_hs varchar(100)  DEFAULT NULL COMMENT '全部区域户数', 
qbqy_gl varchar(100)  DEFAULT NULL COMMENT '全部区域功率(MW)', 
zsj_hs varchar(100)  DEFAULT NULL COMMENT '总数据户数', 
zsj_gl varchar(100)  DEFAULT NULL COMMENT '总数据功率(MW)', 
hyhj_hs varchar(100)  DEFAULT NULL COMMENT '户用合计户数', 
hyhj_gl varchar(100)  DEFAULT NULL COMMENT '户用合计功率(MW)', 
ayhy_hs varchar(100)  DEFAULT NULL COMMENT '安阳户用户数', 
ayhy_gl varchar(100)  DEFAULT NULL COMMENT '安阳户用功率(MW)', 
zhhy_hs varchar(100)  DEFAULT NULL COMMENT '庄河户用户数', 
zhhy_gl varchar(100)  DEFAULT NULL COMMENT '庄河户用功率(MW)', 
qbhy_hs varchar(100)  DEFAULT NULL COMMENT '曲阜户用户数', 
qbhy_gl varchar(100)  DEFAULT NULL COMMENT '曲阜户用功率(MW)', 
gsyhj_hs varchar(100)  DEFAULT NULL COMMENT '工商业合计户数', 
gsyhj_gl varchar(100)  DEFAULT NULL COMMENT '工商业合计功率(MW)', 
aygsy_hs varchar(100)  DEFAULT NULL COMMENT '安阳工商业户数', 
aygsy_gl varchar(100)  DEFAULT NULL COMMENT '安阳工商业功率(MW)', 
zhgsy_hs varchar(100)  DEFAULT NULL COMMENT '庄河工商业户数', 
zhgsy_gl varchar(100)  DEFAULT NULL COMMENT '庄河工商业功率(MW)', 
qbgsy_hs varchar(100)  DEFAULT NULL COMMENT '曲阜工商业户数', 
qbgsy_gl varchar(100)  DEFAULT NULL COMMENT '曲阜工商业功率(MW)', 
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB COMMENT="项目各流程通过数据表";