DROP TABLE IF EXISTS `promise_self_file`;
CREATE TABLE `promise_self_file`
(
    `id`          int(32)     NOT NULL AUTO_INCREMENT COMMENT 'id',
    `sid`         varchar(64) NOT NULL COMMENT 'sid 标识 技术人员扩展表',
    `lockVersion` int(32)     NOT NULL DEFAULT '0' COMMENT '记录版本，锁',
    `createTime`  timestamp   NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '记录创建时间',
    `modifyTime`  timestamp   NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '记录最后修改时间',
    `isEnable`    int(32)     NOT NULL DEFAULT '1' COMMENT '记录是否可用，1:可用，0:不可用',
    `state`       int(11)              DEFAULT '1' COMMENT '记录状态值',
    `isDelete`    int(32)              DEFAULT '0' COMMENT '记录是否被删除，0:未删除，1:已经删除',
    `remarks`     varchar(255)         DEFAULT NULL COMMENT '备注信息',
    `createBySid` varchar(64)          DEFAULT NULL COMMENT '创建者',
    `updateBySid` varchar(64)          DEFAULT NULL COMMENT '更新者',
    `industryKey` varchar(64)          DEFAULT NULL COMMENT '行业key',
    `filePath`    varchar(64)          DEFAULT NULL COMMENT '模板路径',
    `fileName`    varchar(64) NULL     DEFAULT NULL COMMENT '模板名称',
    PRIMARY KEY (`id`)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8
  ROW_FORMAT = DYNAMIC COMMENT ='自评表模板文件';