INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (10, '8868f61a-9966-40fa-a5e8-9280966f5d3a', 0, '2023-05-09 13:45:55', '2023-05-09 13:45:55', 1, 1, 0, NULL, NULL, NULL, '1#', '200T', '50959b0e-8dcf-490c-b45b-dd0ba65a6039', 54.00, 54.00, 25.72, NULL, 0.00, 28.260, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (11, 'c464a850-0877-4254-81e5-06b0f186ff5a', 0, '2023-05-09 13:46:07', '2023-05-09 13:46:07', 1, 1, 0, NULL, NULL, NULL, '2#', '200T', '7dc418b1-4c1c-496e-9767-db2a6880f6e2', 32.92, 32.92, 23.92, NULL, 0.00, 28.260, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (12, '48ee8701-3364-4354-b214-d1b67ee3f081', 0, '2023-05-09 13:46:19', '2023-05-09 13:46:19', 1, 1, 0, NULL, NULL, NULL, '3#', '200T', '102c7a43-c338-4055-8ec1-df6ce774bc86', 93.35, 93.35, 18.00, NULL, 0.00, 28.260, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (13, '2d925f8b-0538-4e7d-ba75-32c1be826d11', 0, '2023-05-09 13:46:25', '2023-05-09 13:46:25', 1, 1, 0, NULL, NULL, NULL, '4#', '200T', '7dc418b1-4c1c-496e-9767-db2a6880f6e2', 36.00, 36.00, 36.00, NULL, 0.00, 28.260, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (14, '946f1730-093b-4a27-878b-76c509da7bff', 0, '2023-05-09 13:46:32', '2023-05-09 13:46:32', 1, 1, 0, NULL, NULL, NULL, '5#', '200T', 'f67ab75e-71bc-4fb9-b47f-1a71e78cd4cf', 20.57, 20.57, 23.14, NULL, 0.00, 28.260, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (15, '49a57db2-95e9-4255-9259-4e9c762c08d3', 0, '2023-05-09 13:46:38', '2023-05-09 13:46:38', 1, 1, 0, NULL, NULL, NULL, '6#', '200T', 'f67ab75e-71bc-4fb9-b47f-1a71e78cd4cf', 35.49, 35.49, 35.49, NULL, 0.00, 28.260, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (16, 'c4204f4f-8923-40c5-a2f3-9deec491d1c6', 0, '2023-05-09 13:46:47', '2023-05-09 13:46:47', 1, 1, 0, NULL, NULL, NULL, '7#', '100T', '56fcac4e-2c37-499d-80ca-043eacbe877c', 64.22, 30.36, 3.57, NULL, 0.00, 19.625, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (17, '39538efb-3862-4d24-9c3c-d4bb110a6cf6', 0, '2023-05-09 13:46:54', '2023-05-09 13:46:54', 1, 1, 0, NULL, NULL, NULL, '8#', '100T', '56fcac4e-2c37-499d-80ca-043eacbe877c', 0.00, 0.00, 0.00, NULL, 0.00, 19.625, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (18, 'c35e6a05-8032-4ceb-ab53-88e913cdeb76', 0, '2023-05-09 13:47:05', '2023-05-09 13:47:05', 1, 1, 0, NULL, NULL, NULL, '9#', '60T', '25d6f585-887a-425d-96d6-37f66dabae5b', 30.43, 30.43, 22.69, NULL, 0.00, 11.335, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (19, '4393ac9e-2394-4a99-9fed-a7d86ea60b3b', 0, '2023-05-09 13:47:11', '2023-05-09 13:47:11', 1, 1, 0, NULL, NULL, NULL, '10#', '60T', '25d6f585-887a-425d-96d6-37f66dabae5b', 0.00, 0.00, 3.82, NULL, 0.00, 11.335, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (20, '05d0e942-020b-45c8-a6ea-82e5c63e673b', 0, '2023-05-09 13:47:18', '2023-05-09 13:47:18', 1, 1, 0, NULL, NULL, NULL, '11#', '60T', '25d6f585-887a-425d-96d6-37f66dabae5b', 0.00, 0.00, 0.00, NULL, 0.00, 11.335, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (21, '1dbd4602-48e0-42a6-9841-2e075697f4c6', 0, '2023-05-09 13:47:52', '2023-05-09 13:47:52', 1, 1, 0, NULL, NULL, NULL, 'A01', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (22, '8c2eeadb-fb61-4633-afaa-fc3a7a0a4584', 0, '2023-05-09 13:47:59', '2023-05-09 13:47:59', 1, 1, 0, NULL, NULL, NULL, 'A02', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (23, '72883c96-030d-499f-9a64-e9187f4bbc29', 0, '2023-05-09 13:48:05', '2023-05-09 13:48:05', 1, 1, 0, NULL, NULL, NULL, 'A03', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (24, '9cc49489-98d8-4354-b9ce-813ec9af70b7', 0, '2023-05-09 13:48:10', '2023-05-09 13:48:10', 1, 1, 0, NULL, NULL, NULL, 'A04', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (25, '45860dc9-7c76-4683-9703-dfcf8a699bef', 0, '2023-05-09 13:48:16', '2023-05-09 13:48:16', 1, 1, 0, NULL, NULL, NULL, 'A05', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (26, '62796ed0-3a99-4449-9632-c6d70b3b4894', 0, '2023-05-09 13:48:21', '2023-05-09 13:48:21', 1, 1, 0, NULL, NULL, NULL, 'A06', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (27, '7283702d-5192-4800-a153-7f332f52601f', 0, '2023-05-09 13:48:26', '2023-05-09 13:48:26', 1, 1, 0, NULL, NULL, NULL, 'A07', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (28, '157dd49e-fff6-4e78-9887-6fc827f423e2', 0, '2023-05-09 13:48:31', '2023-05-09 13:48:31', 1, 1, 0, NULL, NULL, NULL, 'A08', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (29, 'dfec6aa6-40d7-4f11-93b0-f6be77e83b33', 0, '2023-05-09 13:48:36', '2023-05-09 13:48:36', 1, 1, 0, NULL, NULL, NULL, 'A09', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (30, '5a51f78b-3701-4db8-ba45-2ace629c92e0', 0, '2023-05-09 13:48:42', '2023-05-09 13:48:42', 1, 1, 0, NULL, NULL, NULL, 'A10', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (31, '93b7e388-80bf-4a4c-9057-d98e8f019d00', 0, '2023-05-09 13:48:46', '2023-05-09 13:48:46', 1, 1, 0, NULL, NULL, NULL, 'A11', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (32, 'c3ac81ac-8963-4f52-807d-b6d5e92eaebf', 0, '2023-05-09 13:48:52', '2023-05-09 13:48:52', 1, 1, 0, NULL, NULL, NULL, 'A12', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (33, '20eab847-d95f-4048-a657-fe81040e9978', 0, '2023-05-09 13:48:57', '2023-05-09 13:48:57', 1, 1, 0, NULL, NULL, NULL, 'A13', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (34, '469e7ab6-0ca6-4099-afd5-3757c02cb25f', 0, '2023-05-09 13:49:02', '2023-05-09 13:49:02', 1, 1, 0, NULL, NULL, NULL, 'A14', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (35, 'c593ae9b-8493-4073-becd-91c0d9cf09bc', 0, '2023-05-09 13:49:09', '2023-05-09 13:49:09', 1, 1, 0, NULL, NULL, NULL, 'A15', '500T', '', 0.00, 0.00, 0.00, NULL, NULL, NULL, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (38, '34daabb4-21a4-472a-bf44-b49a207323f3', 0, '2023-05-12 11:02:15', '2023-05-12 11:02:15', 1, 1, 0, NULL, NULL, NULL, '室内亚麻油1', '100', 'ae71e0dd-f7e5-415c-9eaa-2b327571bb59', 7.71, 7.71, 27.00, '', 5.00, 7.065, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (39, 'fb1f8246-4861-49d8-b193-0cc29ec70f8d', 0, '2023-05-12 11:02:55', '2023-05-12 11:02:55', 1, 1, 0, NULL, NULL, NULL, '室内芝麻油', '100', 'b38bb339-3717-4eb0-bc93-fe0d19856e03', 12.73, 12.73, 12.73, '', 5.00, 7.065, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (40, '2f1f4ef1-fade-43df-b5b4-0412d4959508', 0, '2023-05-12 11:03:38', '2023-05-12 11:03:38', 1, 1, 0, NULL, NULL, NULL, '室内花生油', '100', '56fcac4e-2c37-499d-80ca-043eacbe877c', 0.45, 0.45, 0.45, '', 5.00, 7.065, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (41, 'b6245520-51ff-4918-92a2-bf0a8043ec21', 0, '2023-05-12 11:04:23', '2023-05-12 11:04:23', 1, 1, 0, NULL, NULL, NULL, '室内亚麻油2', '100', 'ae71e0dd-f7e5-415c-9eaa-2b327571bb59', 1.54, 1.54, 0.96, '', 5.00, 7.065, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (42, '3b2be451-082e-4f4a-8313-8c6475a700e1', 0, '2023-05-12 11:04:59', '2023-05-12 11:04:59', 1, 1, 0, NULL, NULL, NULL, '室内葵花油', '100', '7af3aeec-54e2-4127-90b3-8cbfc2f62674', 18.64, 18.64, 22.63, '', 5.00, 7.065, 0.91, NULL);
INSERT INTO `yxt_supervise_cyf`.`tank_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `number`, `capacity`, `crudeSid`, `inventory`, `initialInventory`, `existingInventory`, `flowmeterSid`, `height`, `bottomArea`, `density`, `totalValue`) VALUES (45, '6c9124fc-85c8-43a9-a054-e589f923bfed', 0, '2023-05-16 17:56:33', '2023-05-16 17:56:33', 1, 1, 0, NULL, NULL, NULL, '散装', '', '', 0.00, 0.00, 0.00, '', 0.00, 0.000, 0.00, NULL);


INSERT INTO `yxt_supervise_cyf`.`crude_oil_type_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `price`) VALUES (11, '7211de74-6a88-4ee5-8843-c1427f549a98', 0, '2023-05-09 13:41:50', '2023-05-09 13:41:50', 1, 1, 0, NULL, NULL, NULL, '一级豆油', '3号', '001', NULL);
INSERT INTO `yxt_supervise_cyf`.`crude_oil_type_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `price`) VALUES (12, '7dc418b1-4c1c-496e-9767-db2a6880f6e2', 0, '2023-05-09 13:42:08', '2023-05-09 13:42:08', 1, 1, 0, NULL, NULL, NULL, '三级豆油', '4号', '002', NULL);
INSERT INTO `yxt_supervise_cyf`.`crude_oil_type_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `price`) VALUES (13, '25d6f585-887a-425d-96d6-37f66dabae5b', 0, '2023-05-09 13:42:21', '2023-05-09 13:42:21', 1, 1, 0, NULL, NULL, NULL, '菜籽油', '9号', '003', NULL);
INSERT INTO `yxt_supervise_cyf`.`crude_oil_type_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `price`) VALUES (14, 'f67ab75e-71bc-4fb9-b47f-1a71e78cd4cf', 0, '2023-05-09 13:42:36', '2023-05-09 13:42:36', 1, 1, 0, NULL, NULL, NULL, '玉米油', '5号', '004', NULL);
INSERT INTO `yxt_supervise_cyf`.`crude_oil_type_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `price`) VALUES (15, '7af3aeec-54e2-4127-90b3-8cbfc2f62674', 0, '2023-05-09 13:42:49', '2023-05-09 13:42:49', 1, 1, 0, NULL, NULL, NULL, '葵花油', '6号', '005', NULL);
INSERT INTO `yxt_supervise_cyf`.`crude_oil_type_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `price`) VALUES (16, '56fcac4e-2c37-499d-80ca-043eacbe877c', 0, '2023-05-09 13:43:00', '2023-05-09 13:43:00', 1, 1, 0, NULL, NULL, NULL, '花生油', '7号', '006', NULL);
INSERT INTO `yxt_supervise_cyf`.`crude_oil_type_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `price`) VALUES (17, '102c7a43-c338-4055-8ec1-df6ce774bc86', 0, '2023-05-11 11:59:15', '2023-05-11 11:59:15', 1, 1, 0, NULL, NULL, NULL, '转基因大豆油', '2', '007', NULL);
INSERT INTO `yxt_supervise_cyf`.`crude_oil_type_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `price`) VALUES (18, '50959b0e-8dcf-490c-b45b-dd0ba65a6039', 0, '2023-05-11 12:00:16', '2023-05-11 12:00:16', 1, 1, 0, NULL, NULL, NULL, '非转基因大豆油', '1', '008', NULL);
INSERT INTO `yxt_supervise_cyf`.`crude_oil_type_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `price`) VALUES (19, 'ae71e0dd-f7e5-415c-9eaa-2b327571bb59', 0, '2023-05-12 10:55:51', '2023-05-12 10:55:51', 1, 1, 0, NULL, NULL, NULL, '亚麻油', '3', '009', NULL);
INSERT INTO `yxt_supervise_cyf`.`crude_oil_type_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `price`) VALUES (20, 'b38bb339-3717-4eb0-bc93-fe0d19856e03', 0, '2023-05-12 10:56:40', '2023-05-12 10:56:40', 1, 1, 0, NULL, NULL, NULL, '芝麻油', '4', '010', NULL);
INSERT INTO `yxt_supervise_cyf`.`crude_oil_type_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `price`) VALUES (21, 'a6ffa75a-9325-409b-a159-462f6f925167', 0, '2023-05-12 10:57:29', '2023-05-12 10:57:29', 1, 1, 0, NULL, NULL, NULL, '橄榄油', '5', '011', NULL);


INSERT INTO `yxt_supervise_cyf`.`flowmeter_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `tankSid`) VALUES (1, '48637760-6e93-4cf2-8b02-cfa44d7ef8be', 0, '2023-05-11 10:24:37', '2023-05-11 10:24:37', 1, 1, 0, NULL, NULL, NULL, '1', '1', '1', 'c464a850-0877-4254-81e5-06b0f186ff5a');
INSERT INTO `yxt_supervise_cyf`.`flowmeter_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `tankSid`) VALUES (2, '6073a38b-d559-4e5d-8497-111f51681a89', 0, '2023-05-11 10:25:26', '2023-05-11 10:25:26', 1, 1, 0, NULL, NULL, NULL, '2', '2', '2', 'c464a850-0877-4254-81e5-06b0f186ff5a');
INSERT INTO `yxt_supervise_cyf`.`flowmeter_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `tankSid`) VALUES (3, '127fcce0-3afd-4d6f-b275-a3adff52110f', 0, '2023-05-11 10:25:37', '2023-05-11 10:25:37', 1, 1, 0, NULL, NULL, NULL, '3', '3', '3', 'c464a850-0877-4254-81e5-06b0f186ff5a');
INSERT INTO `yxt_supervise_cyf`.`flowmeter_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `tankSid`) VALUES (4, '13708c58-ffec-418b-ae15-e6fe55b59efd', 0, '2023-05-11 10:25:47', '2023-05-11 10:25:47', 1, 1, 0, NULL, NULL, NULL, '4', '4', '4', 'c464a850-0877-4254-81e5-06b0f186ff5a');
INSERT INTO `yxt_supervise_cyf`.`flowmeter_information`(`id`, `sid`, `lockVersion`, `createTime`, `modifyTime`, `isEnable`, `state`, `isDelete`, `remarks`, `createBySid`, `updateBySid`, `name`, `number`, `code`, `tankSid`) VALUES (5, '5f2072a5-803e-4cf3-913b-4c066cd83532', 0, '2023-05-11 10:25:58', '2023-05-11 10:25:58', 1, 1, 0, NULL, NULL, NULL, '5', '5', '5', 'c464a850-0877-4254-81e5-06b0f186ff5a');




