/*
 Navicat Premium Data Transfer

 Source Server         : localhost_3306
 Source Server Type    : MySQL
 Source Server Version : 80027
 Source Host           : localhost:3306
 Source Schema         : supervise_supplychain

 Target Server Type    : MySQL
 Target Server Version : 80027
 File Encoding         : 65001

 Date: 18/04/2023 09:22:59
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for supplier_files
-- ----------------------------
DROP TABLE IF EXISTS `supplier_files`;
CREATE TABLE `supplier_files`  (
  `id` int(0) NOT NULL AUTO_INCREMENT,
  `sid` varchar(36) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT 'sid',
  `type` varchar(10) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '合同、营业执照',
  `url` varchar(200) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '附件地址',
  `mainSid` varchar(40) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '主表sid',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8 COLLATE = utf8_general_ci COMMENT = '供应商信息' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
